TIARA Technical Description: : : 5

Figure 1: Schematic side view of TIARA: (a) the back-angle annular detector, (b) the “barrel” around the target, in the form of an octagonal box, (c) the forward angle annular detector. The dimensions may be changed in the final design; they serve to illustrate a possible implementation using reasonably sized detectors.